EISCAT SVALBARD RADAR

SP-NI-ION, 32m, steffe, 20 August 2006

Altitude (km)

10:00 10:30 11:00 11:30 12:00 12:30 13:00 13:30 14:00 200

250

300

350

400

Electron Density (m -3)

10^{10}

10^{11}

10^{12}

10:00 10:30 11:00 11:30 12:00 12:30 13:00 13:30 14:00 200

250

300

350

400

Electron Temperature (K)

0 1000

2000

3000

4000

5000

6000

10:00 10:30 11:00 11:30 12:00 12:30 13:00 13:30 14:00 200

250

300

350

400

Ion Temperature (K)

0 1000

2000

3000

4000

5000

6000

UNIVERSAL TIME

10:00 10:30 11:00 11:30 12:00 12:30 13:00 13:30 14:00 200

250

300

350

400

Ion Drift Velocity (ms

-1) (away)

-1000

-500

0

500

1000