EISCAT UHF RADAR

NI, kir, arc1, 23-24 November 2006

Produced@EISCAT-K, 24-Nov-2006 Not for publication - see Rules-of-the-road

Electron Density (m -3)

23:00 00:00 01:00 02:00 03:00

10^{10}

10^{11}

10^{12}

Temperatures (K)

Electron Ion

23:00 00:00 01:00 02:00 03:00 0 2000

4000

6000

8000

10000

Ion Drift Velocity (ms -1) positive away

23:00 00:00 01:00 02:00 03:00

-2000

-1000 0 1000

2000

3000

4000

Radar parameters

Power (10kW)

Latitude (

°N)Longitude (

°E)Altitude (km)

System Temperature (K)

Offset ( μs)

UNIVERSAL TIME

23:00 00:00 01:00 02:00 03:00 0 50 100 150 200 250 300

EISCAT Scientific Association