EISCAT SVALBARD RADAR

NI, 42m, tau7, 25 July 2007

Produced@x235esr, 30-Jul-2007 Not for publication - see Rules-of-the-road

Altitude (km)

08:55 09:00 09:05 09:10 09:15 09:20 200 400 600 800

Electron Density (m -3)

10^{10}

10^{11}

10^{12}

08:55 09:00 09:05 09:10 09:15 09:20 200 400 600 800

Electron Temperature (K)

0 1000

2000

3000

4000

08:55 09:00 09:05 09:10 09:15 09:20 200 400 600 800

Ion Temperature (K)

0

1000

2000

3000

08:55 09:00 09:05 09:10 09:15 09:20 200 400 600 800

Ion Drift Velocity (ms

-1) (away)

-200

-100 0 100 200

Radar parameters

Power (10kW)

Azimuth(

°)Elevation(

°)System Temperature (K)

UNIVERSAL TIME

08:55 09:00 09:05 09:10 09:15 09:20 0 100 200 300

EISCAT Scientific Association