200 400 600 800 1000 1200

-200 0 200 400 600 800

Altitude (km)

Power (K)

0 2 4 6 8 7 8

13 Tsys=[73 73]K (163K)

Amplitude

Alternating code

Altitude (km)

Frequency (kHz)

-20 -10 0 10 20 200 400 600 800

tau7 2007-07-04 0905:23 6s 932kW 182.1/81.6

-50 0 50

0.25 0.3 0.35 0.4 0.45 Background

Power (K/kHz)

Frequency (kHz)