EISCAT UHF RADAR

SP, uhfa, beata, 5-6 March 2022

Produced@cm1, 16-Mar-2022

EISCAT Scientific Association

E

I

S

C

A

T

S

C

I

E

N

T

I

F

I

C

A

S

S

O

C

I

A

T

I

O

N

21:00 21:30 22:00 22:30 23:00 23:30 00:00 00:30 01:00 01:30 02:00 02:30 03:00

80

100

120

140

160

180

200

Altitude (km)

10^9

10^{10}

10^{11}

10^{12}

Electron Density (m^{-3})

21:00 21:30 22:00 22:30 23:00 23:30 00:00 00:30 01:00 01:30 02:00 02:30 03:00 UNIVERSAL TIME

0

50

100

150

200

250

300

350

Radar parameters

Power (10kW)

Azimuth( °)

Elevation( °)

System Temperature (K)

Phasepushing (Hz)