EISCAT VHF RADAR

UP, vhf, manda, 25 January 2012

Produced@, 05-Mar-2015

Altitude (km)

04:51 04:51 04:52 04:52 04:53 04:53 04:54 04:54 04:55 04:55 04:56 80

90

100

110

120

130

140

Electron Density (m -3)

10^9

10^{10}

10^{11}

10^{12}

UNIVERSAL TIME

04:51 04:51 04:52 04:52 04:53 04:53 04:54 04:54 04:55 04:55 04:56 80

90

100

110

120

130

140

Raw electron density (m

10^9

10^{10}

10^{11}

10^{12}

EISCAT Scientific Association